π^0 spectra

0

1000

2000

3000

4000

5000

0 0.1 0.2 0.3

99/04/28 15.35

M(π^0), GeV/c^2

-0.15

-0.1

-0.05

0

0.05

0.1

0.15

0 1 2 3 4 p_T, GeV/c x_F